(kicad_sch
	(version 20250114)
	(generator "eeschema")
	(generator_version "9.0")
	(paper "A4")
	(title_block
		(title "sch04")
		(date "20 oct 2012")
		(rev "1.0")
	)
	(lib_symbols
		(symbol "Connector_Generic:Conn_01x04"
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 5.08 0)
			)
			(property "Value" "Conn_01x04"
				(at 0 -7.62 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x04, script generated (kicad-library-utils/schlib/autogen/connector/)"
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x04_1_1"
				(rectangle
					(start -1.27 3.81)
					(end 1.27 -6.35)
					(fill
						(type background)
					)
				)
				(rectangle
					(start -1.27 2.667)
					(end 0 2.413)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 0.127)
					(end 0 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -2.413)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -4.953)
					(end 0 -5.207)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 2.54 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at -5.08 -5.08 0)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Connector_Generic:Conn_01x17"
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "J"
				(at 0 22.86 0)
			)
			(property "Value" "Conn_01x17"
				(at 0 -22.86 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Generic connector, single row, 01x17, script generated (kicad-library-utils/schlib/autogen/connector/)"
				(at 0 0 0)
			)
			(property "ki_keywords" "connector"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Connector*:*_1x??_*"
				(at 0 0 0)
			)
			(symbol "Conn_01x17_1_1"
				(rectangle
					(start -1.27 21.59)
					(end 1.27 -21.59)
					(fill
						(type background)
					)
				)
				(rectangle
					(start -1.27 20.447)
					(end 0 20.193)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 17.907)
					(end 0 17.653)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 15.367)
					(end 0 15.113)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 12.827)
					(end 0 12.573)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 10.287)
					(end 0 10.033)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 7.747)
					(end 0 7.493)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 5.207)
					(end 0 4.953)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 2.667)
					(end 0 2.413)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 0.127)
					(end 0 -0.127)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -2.413)
					(end 0 -2.667)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -4.953)
					(end 0 -5.207)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -7.493)
					(end 0 -7.747)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -10.033)
					(end 0 -10.287)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -12.573)
					(end 0 -12.827)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -15.113)
					(end 0 -15.367)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -17.653)
					(end 0 -17.907)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.27 -20.193)
					(end 0 -20.447)
					(fill
						(type none)
					)
				)
				(pin passive line
					(at -5.08 20.32 0)
					(length 3.81)
					(name "Pin_1")
					(number "1")
				)
				(pin passive line
					(at -5.08 17.78 0)
					(length 3.81)
					(name "Pin_2")
					(number "2")
				)
				(pin passive line
					(at -5.08 15.24 0)
					(length 3.81)
					(name "Pin_3")
					(number "3")
				)
				(pin passive line
					(at -5.08 12.7 0)
					(length 3.81)
					(name "Pin_4")
					(number "4")
				)
				(pin passive line
					(at -5.08 10.16 0)
					(length 3.81)
					(name "Pin_5")
					(number "5")
				)
				(pin passive line
					(at -5.08 7.62 0)
					(length 3.81)
					(name "Pin_6")
					(number "6")
				)
				(pin passive line
					(at -5.08 5.08 0)
					(length 3.81)
					(name "Pin_7")
					(number "7")
				)
				(pin passive line
					(at -5.08 2.54 0)
					(length 3.81)
					(name "Pin_8")
					(number "8")
				)
				(pin passive line
					(at -5.08 0 0)
					(length 3.81)
					(name "Pin_9")
					(number "9")
				)
				(pin passive line
					(at -5.08 -2.54 0)
					(length 3.81)
					(name "Pin_10")
					(number "10")
				)
				(pin passive line
					(at -5.08 -5.08 0)
					(length 3.81)
					(name "Pin_11")
					(number "11")
				)
				(pin passive line
					(at -5.08 -7.62 0)
					(length 3.81)
					(name "Pin_12")
					(number "12")
				)
				(pin passive line
					(at -5.08 -10.16 0)
					(length 3.81)
					(name "Pin_13")
					(number "13")
				)
				(pin passive line
					(at -5.08 -12.7 0)
					(length 3.81)
					(name "Pin_14")
					(number "14")
				)
				(pin passive line
					(at -5.08 -15.24 0)
					(length 3.81)
					(name "Pin_15")
					(number "15")
				)
				(pin passive line
					(at -5.08 -17.78 0)
					(length 3.81)
					(name "Pin_16")
					(number "16")
				)
				(pin passive line
					(at -5.08 -20.32 0)
					(length 3.81)
					(name "Pin_17")
					(number "17")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:C"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Unpolarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_0_1"
				(polyline
					(pts
						(xy -2.032 0.762) (xy 2.032 0.762)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -2.032 -0.762) (xy 2.032 -0.762)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:C_Polarized"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 0.635 2.54 0)
			)
			(property "Value" "C_Polarized"
				(at 0.635 -2.54 0)
			)
			(property "Footprint" ""
				(at 0.9652 -3.81 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Polarized capacitor"
				(at 0 0 0)
			)
			(property "ki_keywords" "cap capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "CP_*"
				(at 0 0 0)
			)
			(symbol "C_Polarized_0_1"
				(rectangle
					(start -2.286 0.508)
					(end 2.286 1.016)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.778 2.286) (xy -0.762 2.286)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.27 2.794) (xy -1.27 1.778)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start 2.286 -0.508)
					(end -2.286 -1.016)
					(fill
						(type outline)
					)
				)
			)
			(symbol "C_Polarized_1_1"
				(pin passive line
					(at 0 3.81 270)
					(length 2.794)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -3.81 90)
					(length 2.794)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:C_Trim_Small"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.254)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "C"
				(at 1.524 -2.032 0)
			)
			(property "Value" "C_Trim_Small"
				(at 3.048 -3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Trimmable capacitor, small symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "trimmer variable capacitor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "C_*"
				(at 0 0 0)
			)
			(symbol "C_Trim_Small_0_1"
				(polyline
					(pts
						(xy -1.524 0.508) (xy 1.524 0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.524 -0.508) (xy 1.524 -0.508)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 1.524) (xy -0.762 -1.524)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.27 1.27) (xy 0.381 1.778)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "C_Trim_Small_1_1"
				(pin passive line
					(at 0 2.54 270)
					(length 2.032)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 2.032)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:Crystal"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 1.016)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "Y"
				(at 0 3.81 0)
			)
			(property "Value" "Crystal"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Two pin crystal"
				(at 0 0 0)
			)
			(property "ki_keywords" "quartz ceramic resonator oscillator"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "Crystal*"
				(at 0 0 0)
			)
			(symbol "Crystal_0_1"
				(polyline
					(pts
						(xy -2.54 0) (xy -1.905 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -1.905 -1.27) (xy -1.905 1.27)
					)
					(fill
						(type none)
					)
				)
				(rectangle
					(start -1.143 2.54)
					(end 1.143 -2.54)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 1.905 -1.27) (xy 1.905 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 2.54 0) (xy 1.905 0)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "Crystal_1_1"
				(pin passive line
					(at -3.81 0 0)
					(length 1.27)
					(name "1")
					(number "1")
				)
				(pin passive line
					(at 3.81 0 180)
					(length 1.27)
					(name "2")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:D_Small"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.254)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "D"
				(at -1.27 2.032 0)
			)
			(property "Value" "D_Small"
				(at -3.81 -2.032 0)
			)
			(property "Footprint" ""
				(at 0 0 90)
			)
			(property "Datasheet" "~"
				(at 0 0 90)
			)
			(property "Description" "Diode, small symbol"
				(at 0 0 0)
			)
			(property "Sim.Device" "D"
				(at 0 0 0)
			)
			(property "Sim.Pins" "1=K 2=A"
				(at 0 0 0)
			)
			(property "ki_keywords" "diode"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "TO-???* *_Diode_* *SingleDiode* D_*"
				(at 0 0 0)
			)
			(symbol "D_Small_0_1"
				(polyline
					(pts
						(xy -0.762 0) (xy 0.762 0)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy -0.762 -1.016) (xy -0.762 1.016)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0.762 -1.016) (xy -0.762 0) (xy 0.762 1.016) (xy 0.762 -1.016)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "D_Small_1_1"
				(pin passive line
					(at -2.54 0 0)
					(length 1.778)
					(name "K")
					(number "1")
				)
				(pin passive line
					(at 2.54 0 180)
					(length 1.778)
					(name "A")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Device:R_Small"
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0.254)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "R"
				(at 0 0 90)
			)
			(property "Value" "R_Small"
				(at 1.778 0 90)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "~"
				(at 0 0 0)
			)
			(property "Description" "Resistor, small symbol"
				(at 0 0 0)
			)
			(property "ki_keywords" "R resistor"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "R_*"
				(at 0 0 0)
			)
			(symbol "R_Small_0_1"
				(rectangle
					(start -0.762 1.778)
					(end 0.762 -1.778)
					(fill
						(type none)
					)
				)
			)
			(symbol "R_Small_1_1"
				(pin passive line
					(at 0 2.54 270)
					(length 0.762)
					(name "~")
					(number "1")
				)
				(pin passive line
					(at 0 -2.54 90)
					(length 0.762)
					(name "~")
					(number "2")
				)
			)
			(embedded_fonts no)
		)
		(symbol "MCU_Microchip_PIC16:PIC16F84A-XXSS"
			(pin_names
				(offset 1.016)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at 2.54 22.86 0)
			)
			(property "Value" "PIC16F84A-XXSS"
				(at 2.54 20.32 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" "http://ww1.microchip.com/downloads/en/devicedoc/35007b.pdf"
				(at 0 0 0)
			)
			(property "Description" "PIC16F84A, 1KB Flash, 68B SRAM, 64B EEPROM, SSOP18"
				(at 0 0 0)
			)
			(property "ki_keywords" "Flash-Based 8-Bit Microcontroller"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "SSOP*"
				(at 0 0 0)
			)
			(symbol "PIC16F84A-XXSS_0_1"
				(rectangle
					(start -13.97 19.05)
					(end 13.97 -21.59)
					(fill
						(type background)
					)
				)
			)
			(symbol "PIC16F84A-XXSS_1_1"
				(pin input line
					(at -17.78 15.24 0)
					(length 3.81)
					(name "~{MCLR}")
					(number "4")
				)
				(pin input line
					(at -17.78 10.16 0)
					(length 3.81)
					(name "OSC1/CLKIN")
					(number "18")
				)
				(pin output line
					(at -17.78 5.08 0)
					(length 3.81)
					(name "OSC2/CLKOUT")
					(number "17")
				)
				(pin power_in line
					(at -2.54 22.86 270)
					(length 3.81)
					(name "VDD")
					(number "15")
				)
				(pin power_in line
					(at -2.54 -25.4 90)
					(length 3.81)
					(name "VSS")
					(number "5")
				)
				(pin power_in line
					(at 0 22.86 270)
					(length 3.81)
					(name "VDD")
					(number "16")
				)
				(pin power_in line
					(at 0 -25.4 90)
					(length 3.81)
					(name "VSS")
					(number "6")
				)
				(pin bidirectional line
					(at 17.78 15.24 180)
					(length 3.81)
					(name "RA0")
					(number "19")
				)
				(pin bidirectional line
					(at 17.78 12.7 180)
					(length 3.81)
					(name "RA1")
					(number "20")
				)
				(pin bidirectional line
					(at 17.78 10.16 180)
					(length 3.81)
					(name "RA2")
					(number "1")
				)
				(pin bidirectional line
					(at 17.78 7.62 180)
					(length 3.81)
					(name "RA3")
					(number "2")
				)
				(pin bidirectional line
					(at 17.78 5.08 180)
					(length 3.81)
					(name "T0CKI/RA4")
					(number "3")
				)
				(pin bidirectional line
					(at 17.78 0 180)
					(length 3.81)
					(name "INT/RB0")
					(number "7")
				)
				(pin bidirectional line
					(at 17.78 -2.54 180)
					(length 3.81)
					(name "RB1")
					(number "8")
				)
				(pin bidirectional line
					(at 17.78 -5.08 180)
					(length 3.81)
					(name "RB2")
					(number "9")
				)
				(pin bidirectional line
					(at 17.78 -7.62 180)
					(length 3.81)
					(name "RB3")
					(number "10")
				)
				(pin bidirectional line
					(at 17.78 -10.16 180)
					(length 3.81)
					(name "RB4")
					(number "11")
				)
				(pin bidirectional line
					(at 17.78 -12.7 180)
					(length 3.81)
					(name "RB5")
					(number "12")
				)
				(pin bidirectional line
					(at 17.78 -15.24 180)
					(length 3.81)
					(name "RB6")
					(number "13")
				)
				(pin bidirectional line
					(at 17.78 -17.78 180)
					(length 3.81)
					(name "RB7")
					(number "14")
				)
			)
			(embedded_fonts no)
		)
		(symbol "Regulator_Linear:LM7805_TO220"
			(pin_names
				(offset 0.254)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "U"
				(at -3.81 3.175 0)
			)
			(property "Value" "LM7805_TO220"
				(at 0 3.175 0)
			)
			(property "Footprint" "Package_TO_SOT_THT:TO-220-3_Vertical"
				(at 0 5.715 0)
			)
			(property "Datasheet" "https://www.onsemi.cn/PowerSolutions/document/MC7800-D.PDF"
				(at 0 -1.27 0)
			)
			(property "Description" "Positive 1A 35V Linear Regulator, Fixed Output 5V, TO-220"
				(at 0 0 0)
			)
			(property "ki_keywords" "Voltage Regulator 1A Positive"
				(at 0 0 0)
			)
			(property "ki_fp_filters" "TO?220*"
				(at 0 0 0)
			)
			(symbol "LM7805_TO220_0_1"
				(rectangle
					(start -5.08 1.905)
					(end 5.08 -5.08)
					(fill
						(type background)
					)
				)
			)
			(symbol "LM7805_TO220_1_1"
				(pin power_in line
					(at -7.62 0 0)
					(length 2.54)
					(name "VI")
					(number "1")
				)
				(pin power_in line
					(at 0 -7.62 90)
					(length 2.54)
					(name "GND")
					(number "2")
				)
				(pin power_out line
					(at 7.62 0 180)
					(length 2.54)
					(name "VO")
					(number "3")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:+5V"
			(power)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -3.81 0)
			)
			(property "Value" "+5V"
				(at 0 3.556 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+5V\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+5V_0_1"
				(polyline
					(pts
						(xy -0.762 1.27) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.54) (xy 0.762 1.27)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 2.54)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+5V_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:+VDC"
			(power)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -2.54 0)
			)
			(property "Value" "+VDC"
				(at 0 6.35 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"+VDC\""
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "+VDC_0_1"
				(polyline
					(pts
						(xy -1.143 3.175) (xy 1.143 3.175)
					)
					(fill
						(type none)
					)
				)
				(circle
					(center 0 3.175)
					(radius 1.905)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 2.032) (xy 0 4.318)
					)
					(fill
						(type none)
					)
				)
				(polyline
					(pts
						(xy 0 0) (xy 0 1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "+VDC_1_1"
				(pin power_in line
					(at 0 0 90)
					(length 0)
					(name "~")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
		(symbol "power:GND"
			(power)
			(pin_numbers
				(hide yes)
			)
			(pin_names
				(offset 0)
				(hide yes)
			)
			(exclude_from_sim no)
			(in_bom yes)
			(on_board yes)
			(property "Reference" "#PWR"
				(at 0 -6.35 0)
			)
			(property "Value" "GND"
				(at 0 -3.81 0)
			)
			(property "Footprint" ""
				(at 0 0 0)
			)
			(property "Datasheet" ""
				(at 0 0 0)
			)
			(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
				(at 0 0 0)
			)
			(property "ki_keywords" "global power"
				(at 0 0 0)
			)
			(symbol "GND_0_1"
				(polyline
					(pts
						(xy 0 0) (xy 0 -1.27) (xy 1.27 -1.27) (xy 0 -2.54) (xy -1.27 -1.27) (xy 0 -1.27)
					)
					(fill
						(type none)
					)
				)
			)
			(symbol "GND_1_1"
				(pin power_in line
					(at 0 0 270)
					(length 0)
					(name "~")
					(number "1")
				)
			)
			(embedded_fonts no)
		)
	)
	(junction
		(at 165.1 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 134.62 137.16)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 134.62 77.47)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 111.76 137.16)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 69.85 109.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 156.21 109.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 100.33 137.16)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 77.47 109.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 134.62 83.82)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 73.66 137.16)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 157.48 104.14)
		(diameter 0)
		(color 0 0 0 0)
	)
	(junction
		(at 92.71 109.22)
		(diameter 0)
		(color 0 0 0 0)
	)
	(wire
		(pts
			(xy 163.83 80.01) (xy 114.3 80.01)
		)
	)
	(wire
		(pts
			(xy 69.85 116.84) (xy 69.85 120.65)
		)
	)
	(wire
		(pts
			(xy 132.08 83.82) (xy 132.08 86.36)
		)
	)
	(wire
		(pts
			(xy 111.76 137.16) (xy 111.76 140.97)
		)
	)
	(wire
		(pts
			(xy 73.66 137.16) (xy 73.66 139.7)
		)
	)
	(wire
		(pts
			(xy 134.62 77.47) (xy 134.62 83.82)
		)
	)
	(wire
		(pts
			(xy 134.62 134.62) (xy 134.62 137.16)
		)
	)
	(wire
		(pts
			(xy 152.4 77.47) (xy 165.1 77.47)
		)
	)
	(wire
		(pts
			(xy 134.62 137.16) (xy 134.62 140.97)
		)
	)
	(wire
		(pts
			(xy 100.33 148.59) (xy 100.33 152.4)
		)
	)
	(wire
		(pts
			(xy 87.63 144.78) (xy 87.63 152.4)
		)
	)
	(wire
		(pts
			(xy 134.62 83.82) (xy 134.62 86.36)
		)
	)
	(wire
		(pts
			(xy 152.4 116.84) (xy 173.99 116.84)
		)
	)
	(wire
		(pts
			(xy 100.33 137.16) (xy 100.33 140.97)
		)
	)
	(wire
		(pts
			(xy 114.3 93.98) (xy 116.84 93.98)
		)
	)
	(wire
		(pts
			(xy 152.4 96.52) (xy 161.29 96.52)
		)
	)
	(wire
		(pts
			(xy 161.29 96.52) (xy 161.29 99.06)
		)
	)
	(wire
		(pts
			(xy 92.71 118.11) (xy 92.71 120.65)
		)
	)
	(wire
		(pts
			(xy 152.4 104.14) (xy 157.48 104.14)
		)
	)
	(wire
		(pts
			(xy 162.56 96.52) (xy 173.99 96.52)
		)
	)
	(wire
		(pts
			(xy 69.85 111.76) (xy 69.85 109.22)
		)
	)
	(wire
		(pts
			(xy 157.48 106.68) (xy 173.99 106.68)
		)
	)
	(wire
		(pts
			(xy 111.76 132.08) (xy 111.76 137.16)
		)
	)
	(wire
		(pts
			(xy 69.85 109.22) (xy 77.47 109.22)
		)
	)
	(wire
		(pts
			(xy 114.3 80.01) (xy 114.3 93.98)
		)
	)
	(wire
		(pts
			(xy 160.02 99.06) (xy 160.02 101.6)
		)
	)
	(wire
		(pts
			(xy 156.21 109.22) (xy 156.21 59.69)
		)
	)
	(wire
		(pts
			(xy 152.4 124.46) (xy 173.99 124.46)
		)
	)
	(wire
		(pts
			(xy 152.4 109.22) (xy 156.21 109.22)
		)
	)
	(wire
		(pts
			(xy 132.08 134.62) (xy 132.08 137.16)
		)
	)
	(wire
		(pts
			(xy 88.9 109.22) (xy 92.71 109.22)
		)
	)
	(wire
		(pts
			(xy 156.21 59.69) (xy 173.99 59.69)
		)
	)
	(wire
		(pts
			(xy 165.1 91.44) (xy 173.99 91.44)
		)
	)
	(wire
		(pts
			(xy 73.66 147.32) (xy 73.66 152.4)
		)
	)
	(wire
		(pts
			(xy 170.18 86.36) (xy 170.18 83.82)
		)
	)
	(wire
		(pts
			(xy 173.99 86.36) (xy 170.18 86.36)
		)
	)
	(wire
		(pts
			(xy 152.4 127) (xy 173.99 127)
		)
	)
	(wire
		(pts
			(xy 163.83 93.98) (xy 163.83 80.01)
		)
	)
	(wire
		(pts
			(xy 152.4 99.06) (xy 160.02 99.06)
		)
	)
	(wire
		(pts
			(xy 92.71 104.14) (xy 92.71 109.22)
		)
	)
	(wire
		(pts
			(xy 158.75 101.6) (xy 158.75 104.14)
		)
	)
	(wire
		(pts
			(xy 160.02 101.6) (xy 173.99 101.6)
		)
	)
	(wire
		(pts
			(xy 134.62 77.47) (xy 138.43 77.47)
		)
	)
	(wire
		(pts
			(xy 116.84 104.14) (xy 92.71 104.14)
		)
	)
	(wire
		(pts
			(xy 170.18 88.9) (xy 170.18 134.62)
		)
	)
	(wire
		(pts
			(xy 73.66 137.16) (xy 80.01 137.16)
		)
	)
	(wire
		(pts
			(xy 116.84 99.06) (xy 69.85 99.06)
		)
	)
	(wire
		(pts
			(xy 77.47 118.11) (xy 77.47 120.65)
		)
	)
	(wire
		(pts
			(xy 92.71 109.22) (xy 92.71 110.49)
		)
	)
	(wire
		(pts
			(xy 173.99 64.77) (xy 170.18 64.77)
		)
	)
	(wire
		(pts
			(xy 143.51 77.47) (xy 147.32 77.47)
		)
	)
	(wire
		(pts
			(xy 170.18 64.77) (xy 170.18 68.58)
		)
	)
	(wire
		(pts
			(xy 165.1 77.47) (xy 165.1 62.23)
		)
	)
	(wire
		(pts
			(xy 152.4 93.98) (xy 162.56 93.98)
		)
	)
	(wire
		(pts
			(xy 134.62 83.82) (xy 132.08 83.82)
		)
	)
	(wire
		(pts
			(xy 67.31 137.16) (xy 73.66 137.16)
		)
	)
	(wire
		(pts
			(xy 152.4 121.92) (xy 173.99 121.92)
		)
	)
	(wire
		(pts
			(xy 152.4 111.76) (xy 173.99 111.76)
		)
	)
	(wire
		(pts
			(xy 95.25 137.16) (xy 100.33 137.16)
		)
	)
	(wire
		(pts
			(xy 158.75 104.14) (xy 173.99 104.14)
		)
	)
	(wire
		(pts
			(xy 165.1 62.23) (xy 173.99 62.23)
		)
	)
	(wire
		(pts
			(xy 162.56 93.98) (xy 162.56 96.52)
		)
	)
	(wire
		(pts
			(xy 152.4 101.6) (xy 158.75 101.6)
		)
	)
	(wire
		(pts
			(xy 157.48 57.15) (xy 173.99 57.15)
		)
	)
	(wire
		(pts
			(xy 161.29 99.06) (xy 173.99 99.06)
		)
	)
	(wire
		(pts
			(xy 77.47 109.22) (xy 77.47 110.49)
		)
	)
	(wire
		(pts
			(xy 111.76 148.59) (xy 111.76 152.4)
		)
	)
	(wire
		(pts
			(xy 77.47 109.22) (xy 81.28 109.22)
		)
	)
	(wire
		(pts
			(xy 156.21 109.22) (xy 173.99 109.22)
		)
	)
	(wire
		(pts
			(xy 157.48 104.14) (xy 157.48 57.15)
		)
	)
	(wire
		(pts
			(xy 100.33 137.16) (xy 111.76 137.16)
		)
	)
	(wire
		(pts
			(xy 157.48 104.14) (xy 157.48 106.68)
		)
	)
	(wire
		(pts
			(xy 165.1 77.47) (xy 165.1 91.44)
		)
	)
	(wire
		(pts
			(xy 173.99 93.98) (xy 163.83 93.98)
		)
	)
	(wire
		(pts
			(xy 69.85 99.06) (xy 69.85 109.22)
		)
	)
	(wire
		(pts
			(xy 132.08 137.16) (xy 134.62 137.16)
		)
	)
	(wire
		(pts
			(xy 152.4 114.3) (xy 173.99 114.3)
		)
	)
	(wire
		(pts
			(xy 134.62 73.66) (xy 134.62 77.47)
		)
	)
	(wire
		(pts
			(xy 173.99 88.9) (xy 170.18 88.9)
		)
	)
	(wire
		(pts
			(xy 152.4 119.38) (xy 173.99 119.38)
		)
	)
	(symbol
		(lib_id "power:+VDC")
		(at 170.18 83.82 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR04"
			(at 170.18 86.36 0)
		)
		(property "Value" "+VDC"
			(at 170.18 76.2 0)
		)
		(property "Footprint" ""
			(at 170.18 83.82 0)
		)
		(property "Datasheet" ""
			(at 170.18 83.82 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+VDC\""
			(at 170.18 83.82 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR04")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 73.66 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR01"
			(at 73.66 158.75 0)
		)
		(property "Value" "GND"
			(at 73.66 157.48 0)
		)
		(property "Footprint" ""
			(at 73.66 152.4 0)
		)
		(property "Datasheet" ""
			(at 73.66 152.4 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 73.66 152.4 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR01")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector_Generic:Conn_01x04")
		(at 179.07 59.69 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "J2"
			(at 181.61 59.6899 0)
		)
		(property "Value" "Conn_01x04"
			(at 181.61 62.2299 0)
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x04_P2.54mm_Vertical"
			(at 179.07 59.69 0)
		)
		(property "Datasheet" "~"
			(at 179.07 59.69 0)
		)
		(property "Description" "Generic connector, single row, 01x04, script generated (kicad-library-utils/schlib/autogen/connector/)"
			(at 179.07 59.69 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(pin "4")
		(instances
			(project ""
				(path
					(reference "J2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 69.85 120.65 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR09"
			(at 69.85 127 0)
		)
		(property "Value" "GND"
			(at 69.85 125.73 0)
		)
		(property "Footprint" ""
			(at 69.85 120.65 0)
		)
		(property "Datasheet" ""
			(at 69.85 120.65 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 69.85 120.65 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR09")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Connector_Generic:Conn_01x17")
		(at 179.07 106.68 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "J1"
			(at 181.61 105.4099 0)
		)
		(property "Value" "Conn_01x17"
			(at 181.61 107.9499 0)
		)
		(property "Footprint" "Connector_PinHeader_2.54mm:PinHeader_1x17_P2.54mm_Vertical"
			(at 179.07 106.68 0)
		)
		(property "Datasheet" "~"
			(at 179.07 106.68 0)
		)
		(property "Description" "Generic connector, single row, 01x17, script generated (kicad-library-utils/schlib/autogen/connector/)"
			(at 179.07 106.68 0)
		)
		(pin "11")
		(pin "13")
		(pin "14")
		(pin "15")
		(pin "16")
		(pin "4")
		(pin "17")
		(pin "1")
		(pin "2")
		(pin "12")
		(pin "5")
		(pin "6")
		(pin "7")
		(pin "3")
		(pin "8")
		(pin "9")
		(pin "10")
		(instances
			(project ""
				(path
					(reference "J1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:R_Small")
		(at 140.97 77.47 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "R1"
			(at 140.97 72.39 90)
		)
		(property "Value" "2k2"
			(at 140.97 74.93 90)
		)
		(property "Footprint" ""
			(at 140.97 77.47 0)
		)
		(property "Datasheet" "~"
			(at 140.97 77.47 0)
		)
		(property "Description" "Resistor, small symbol"
			(at 140.97 77.47 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "R1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 77.47 120.65 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR010"
			(at 77.47 127 0)
		)
		(property "Value" "GND"
			(at 77.47 125.73 0)
		)
		(property "Footprint" ""
			(at 77.47 120.65 0)
		)
		(property "Datasheet" ""
			(at 77.47 120.65 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 77.47 120.65 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR010")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 100.33 144.78 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C2"
			(at 104.14 143.5099 0)
		)
		(property "Value" "10n"
			(at 104.14 146.0499 0)
		)
		(property "Footprint" "Capacitor_THT:C_Disc_D3.8mm_W2.6mm_P2.50mm"
			(at 101.2952 148.59 0)
		)
		(property "Datasheet" "~"
			(at 100.33 144.78 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 100.33 144.78 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "C2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "MCU_Microchip_PIC16:PIC16F84A-XXSS")
		(at 134.62 109.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U1"
			(at 136.7633 85.09 0)
		)
		(property "Value" "PIC16F84A-XXSS"
			(at 136.7633 87.63 0)
		)
		(property "Footprint" "Package_DIP:CERDIP-20_W7.62mm_SideBrazed"
			(at 134.62 109.22 0)
		)
		(property "Datasheet" "http://ww1.microchip.com/downloads/en/devicedoc/35007b.pdf"
			(at 134.62 109.22 0)
		)
		(property "Description" "PIC16F84A, 1KB Flash, 68B SRAM, 64B EEPROM, SSOP18"
			(at 134.62 109.22 0)
		)
		(pin "13")
		(pin "14")
		(pin "9")
		(pin "8")
		(pin "15")
		(pin "18")
		(pin "16")
		(pin "6")
		(pin "1")
		(pin "5")
		(pin "7")
		(pin "11")
		(pin "20")
		(pin "10")
		(pin "17")
		(pin "19")
		(pin "2")
		(pin "4")
		(pin "12")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "U1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+5V")
		(at 111.76 132.08 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR013"
			(at 111.76 135.89 0)
		)
		(property "Value" "+5V"
			(at 111.76 127 0)
		)
		(property "Footprint" ""
			(at 111.76 132.08 0)
		)
		(property "Datasheet" ""
			(at 111.76 132.08 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+5V\""
			(at 111.76 132.08 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR013")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 134.62 140.97 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR02"
			(at 134.62 147.32 0)
		)
		(property "Value" "GND"
			(at 134.62 146.05 0)
		)
		(property "Footprint" ""
			(at 134.62 140.97 0)
		)
		(property "Datasheet" ""
			(at 134.62 140.97 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 134.62 140.97 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR02")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+5V")
		(at 134.62 73.66 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR03"
			(at 134.62 77.47 0)
		)
		(property "Value" "+5V"
			(at 134.62 68.58 0)
		)
		(property "Footprint" ""
			(at 134.62 73.66 0)
		)
		(property "Datasheet" ""
			(at 134.62 73.66 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+5V\""
			(at 134.62 73.66 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR03")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Trim_Small")
		(at 69.85 114.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C7"
			(at 72.39 112.9029 0)
		)
		(property "Value" "33p"
			(at 72.39 115.4429 0)
		)
		(property "Footprint" ""
			(at 69.85 114.3 0)
		)
		(property "Datasheet" "~"
			(at 69.85 114.3 0)
		)
		(property "Description" "Trimmable capacitor, small symbol"
			(at 69.85 114.3 0)
		)
		(pin "2")
		(pin "1")
		(instances
			(project ""
				(path
					(reference "C7")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 92.71 120.65 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR011"
			(at 92.71 127 0)
		)
		(property "Value" "GND"
			(at 92.71 125.73 0)
		)
		(property "Footprint" ""
			(at 92.71 120.65 0)
		)
		(property "Datasheet" ""
			(at 92.71 120.65 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 92.71 120.65 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR011")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Regulator_Linear:LM7805_TO220")
		(at 87.63 137.16 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "U2"
			(at 87.63 130.81 0)
		)
		(property "Value" "LM7805_TO220"
			(at 87.63 133.35 0)
		)
		(property "Footprint" "Package_TO_SOT_THT:TO-220-3_Vertical"
			(at 87.63 131.445 0)
		)
		(property "Datasheet" "https://www.onsemi.cn/PowerSolutions/document/MC7800-D.PDF"
			(at 87.63 138.43 0)
		)
		(property "Description" "Positive 1A 35V Linear Regulator, Fixed Output 5V, TO-220"
			(at 87.63 137.16 0)
		)
		(pin "1")
		(pin "2")
		(pin "3")
		(instances
			(project ""
				(path
					(reference "U2")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized")
		(at 73.66 143.51 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C3"
			(at 77.47 141.3509 0)
		)
		(property "Value" "47u"
			(at 77.47 143.8909 0)
		)
		(property "Footprint" "Capacitor_THT:CP_Radial_D8.0mm_P3.50mm"
			(at 74.6252 147.32 0)
		)
		(property "Datasheet" "~"
			(at 73.66 143.51 0)
		)
		(property "Description" "Polarized capacitor"
			(at 73.66 143.51 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "C3")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 170.18 68.58 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR014"
			(at 170.18 74.93 0)
		)
		(property "Value" "GND"
			(at 170.18 73.66 0)
		)
		(property "Footprint" ""
			(at 170.18 68.58 0)
		)
		(property "Datasheet" ""
			(at 170.18 68.58 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 170.18 68.58 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR014")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:Crystal")
		(at 85.09 109.22 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "Y1"
			(at 85.09 101.6 0)
		)
		(property "Value" "12MHz"
			(at 85.09 104.14 0)
		)
		(property "Footprint" "Valve:Valve_Glimm"
			(at 85.09 109.22 0)
		)
		(property "Datasheet" "~"
			(at 85.09 109.22 0)
		)
		(property "Description" "Two pin crystal"
			(at 85.09 109.22 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "Y1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:+VDC")
		(at 67.31 137.16 90)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR012"
			(at 69.85 137.16 0)
		)
		(property "Value" "+VDC"
			(at 60.96 137.1599 90)
		)
		(property "Footprint" ""
			(at 67.31 137.16 0)
		)
		(property "Datasheet" ""
			(at 67.31 137.16 0)
		)
		(property "Description" "Power symbol creates a global label with name \"+VDC\""
			(at 67.31 137.16 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR012")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 111.76 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR07"
			(at 111.76 158.75 0)
		)
		(property "Value" "GND"
			(at 111.76 157.48 0)
		)
		(property "Footprint" ""
			(at 111.76 152.4 0)
		)
		(property "Datasheet" ""
			(at 111.76 152.4 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 111.76 152.4 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR07")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C_Polarized")
		(at 111.76 144.78 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C4"
			(at 115.57 142.6209 0)
		)
		(property "Value" "47u"
			(at 115.57 145.1609 0)
		)
		(property "Footprint" "Capacitor_THT:CP_Radial_D8.0mm_P3.50mm"
			(at 112.7252 148.59 0)
		)
		(property "Datasheet" "~"
			(at 111.76 144.78 0)
		)
		(property "Description" "Polarized capacitor"
			(at 111.76 144.78 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "C4")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 170.18 134.62 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR08"
			(at 170.18 140.97 0)
		)
		(property "Value" "GND"
			(at 170.18 139.7 0)
		)
		(property "Footprint" ""
			(at 170.18 134.62 0)
		)
		(property "Datasheet" ""
			(at 170.18 134.62 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 170.18 134.62 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR08")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 87.63 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR05"
			(at 87.63 158.75 0)
		)
		(property "Value" "GND"
			(at 87.63 157.48 0)
		)
		(property "Footprint" ""
			(at 87.63 152.4 0)
		)
		(property "Datasheet" ""
			(at 87.63 152.4 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 87.63 152.4 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR05")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 92.71 114.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C6"
			(at 96.52 113.0299 0)
		)
		(property "Value" "30p"
			(at 96.52 115.5699 0)
		)
		(property "Footprint" "Capacitor_THT:C_Disc_D3.8mm_W2.6mm_P2.50mm"
			(at 93.6752 118.11 0)
		)
		(property "Datasheet" "~"
			(at 92.71 114.3 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 92.71 114.3 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "C6")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:D_Small")
		(at 149.86 77.47 180)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "D1"
			(at 149.86 71.12 0)
		)
		(property "Value" "1N4148"
			(at 149.86 73.66 0)
		)
		(property "Footprint" ""
			(at 149.86 77.47 90)
		)
		(property "Datasheet" "~"
			(at 149.86 77.47 90)
		)
		(property "Description" "Diode, small symbol"
			(at 149.86 77.47 0)
		)
		(property "Sim.Device" "D"
			(at 149.86 77.47 0)
		)
		(property "Sim.Pins" "1=K 2=A"
			(at 149.86 77.47 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "D1")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "power:GND")
		(at 100.33 152.4 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "#PWR06"
			(at 100.33 158.75 0)
		)
		(property "Value" "GND"
			(at 100.33 157.48 0)
		)
		(property "Footprint" ""
			(at 100.33 152.4 0)
		)
		(property "Datasheet" ""
			(at 100.33 152.4 0)
		)
		(property "Description" "Power symbol creates a global label with name \"GND\" , ground"
			(at 100.33 152.4 0)
		)
		(pin "1")
		(instances
			(project ""
				(path
					(reference "#PWR06")
					(unit 1)
				)
			)
		)
	)
	(symbol
		(lib_id "Device:C")
		(at 77.47 114.3 0)
		(unit 1)
		(exclude_from_sim no)
		(in_bom yes)
		(on_board yes)
		(dnp no)
		(fields_autoplaced yes)
		(property "Reference" "C5"
			(at 81.28 113.0299 0)
		)
		(property "Value" "30p"
			(at 81.28 115.5699 0)
		)
		(property "Footprint" "Capacitor_THT:C_Disc_D3.8mm_W2.6mm_P2.50mm"
			(at 78.4352 118.11 0)
		)
		(property "Datasheet" "~"
			(at 77.47 114.3 0)
		)
		(property "Description" "Unpolarized capacitor"
			(at 77.47 114.3 0)
		)
		(pin "1")
		(pin "2")
		(instances
			(project ""
				(path
					(reference "C5")
					(unit 1)
				)
			)
		)
	)
	(sheet_instances
		(path
			(page "1")
		)
	)
	(embedded_fonts no)
)
